Semester: WS 2016/2017

UnivIS - Lehrveranstaltungsplan

08:00 09:00 10:00 11:00 12:00 13:00 14:00 15:00 16:00 17:00

Mo

Lernen und Lehren

(ab 24.10.)

(Schroeders) MG2/01.11

Di

Introduction to R (Schroeders) RZ/01.02

Mi

Test- und Fragebogenkonstruktion (Schroeders) M3N/-1.19

Neuere Entwicklungen in der Psychologischen Diagnostik (Schroeders) M3/01.16

Do Fr

Stand: Freitag, 23 August 2024 07:22:31