Semester: SS 2019

UnivIS - Lehrveranstaltungsplan

08:00

09:00

10:00

11:00

12:00

13:00

14:00

15:00

16:00

17:00

Mo

12:00 - 14:00

EESYS-DDS-M: Data-driven Decision Support - Übung (Stingl) WE5/01.006

12:00 - 14:00

EESYS-P-SGDA-M: Projekt Smart Grid Data Analytics (Staake) WE5/03.004

14:00 - 16:00

EESYS-IITP-B: Internationales IT-Projektmanagement V/Ü (Staake) WE5/00.019

14:00 - 16:00

EESYS-IITP-B: Internationales IT-Projektmanagement Übung (Weigert) WE5/00.019

Di 08:00 - 10:00

EESYS-DDS-M: Data-driven Decision Support (Hopf) WE5/04.014

12:00 - 14:00

EESYS-P-SGDA-M: Projekt Smart Grid Data Analytics (Staake) WE5/03.004

12:00 - 14:00

IS and behavioral theories and their practical applications (Master) (Staake) WE5/03.004

14:00 - 16:00

IS and behavioral theories and their practical applications (Master) (Staake) WE5/01.006

16:00 - 18:00

EESYS-ES-M: Energieeffiziente Systeme V (Staake) WE5/00.019

Mi 08:00 - 10:00

IS and behavioral theories and their practical applications (Master) (Staake) WE5/05.003, WE5/04.014

10:00 - 12:00

EESYS-IITP-B: Internationales IT-Projektmanagement V/Ü (Staake) WE5/00.022

12:00 - 14:00

IS and behavioral theories and their practical applications (Bachelor) (Staake) WE5/01.006

14:00 - 18:00

EESYS: Masterkolloquium (Staake) WE5/02.020

Do

12:00 - 14:00

EESYS-ES-M (Günther) WE5/00.019

12:00 - 14:00

EESYS-ES-M: Energieeffiziente Systeme V (Staake) WE5/00.019

Fr

Stand: Donnerstag, 26 September 2024 01:40:29