Semester: WS 2016/2017

UnivIS - Lehrveranstaltungsplan

08:00 09:00 10:00 11:00 12:00 13:00 14:00 15:00 16:00 17:00

Mo Di

VS: Steuerung technischer Systeme - Analysis of Megaprojects (Jopke) F21/03.79

Mi

HS: Steuerung technischer Systeme III - Comparing Apples and Oranges: Introduction to Qualitative Comparative Analysis (Jopke) F21/03.80

Do Fr

Stand: Montag, 29 Juli 2024 11:21:38